CREATE TABLE `sentence_testing` (
  `String1` varchar(255) NOT NULL,
  `String2` varchar(255) NOT NULL,
  `score_required` int(11) DEFAULT 0,
  `comperator_for_score` varchar(255) NOT NULL,
  `PerformTestingFittingLess` tinyint(1) DEFAULT 0,
  `rowid` int(11) NOT NULL AUTO_INCREMENT,
  PRIMARY KEY (`rowid`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;
