CREATE TABLE `ban_detector` (
  `fingerprint` varchar(512) DEFAULT NULL,
  `ip` varchar(64) NOT NULL,
  `steamid` varchar(64) NOT NULL,
  `name` varchar(128) DEFAULT NULL,
  `created_on` datetime DEFAULT current_timestamp(),
  `modified_on` datetime DEFAULT NULL,
  `last_connect` datetime DEFAULT NULL,
  `disable_html_motd` int(11) DEFAULT 0,
  PRIMARY KEY (`steamid`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;
